X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/60fef9643dfbe219c51db7218d9cfa846b258f2c..21d6b09b108dd8f4710cf260ee9f344b6bbad704:/docs/latex/wx/dialog.tex

diff --git a/docs/latex/wx/dialog.tex b/docs/latex/wx/dialog.tex
index 1ab082deeb..9181cc2060 100644
--- a/docs/latex/wx/dialog.tex
+++ b/docs/latex/wx/dialog.tex
@@ -326,7 +326,7 @@ The default handler for the wxID\_APPLY identifier.
 
 \wxheading{Remarks}
 
-This function calls \helpref{wxWindow::Validate}{wxwindowvalidate} and \helpref{wxWindow::TransferDataToWindow}{wxwindowtransferdatatowindow}.
+This function calls \helpref{wxWindow::Validate}{wxwindowvalidate} and \helpref{wxWindow::TransferDataFromWindow}{wxwindowtransferdatafromwindow}.
 
 \wxheading{See also}
 
