X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/605d715ddd84ddc3e78423e3f3ae5c27c8ff4d43..e0eedd681816255e89d4cb5725003f479eeb4133:/docs/latex/wx/toolbar.tex?ds=sidebyside

diff --git a/docs/latex/wx/toolbar.tex b/docs/latex/wx/toolbar.tex
index d30db16080..20d988a8f8 100644
--- a/docs/latex/wx/toolbar.tex
+++ b/docs/latex/wx/toolbar.tex
@@ -251,6 +251,9 @@ Enables or disables the tool.
 
 \docparam{enable}{If TRUE, enables the tool, otherwise disables it.}
 
+{\bf NB:} This function should only be called after 
+\helpref{Realize}{wxtoolbarrealize}.
+
 \wxheading{Remarks}
 
 For wxToolBarSimple, does nothing. Some other implementations
@@ -544,10 +547,7 @@ A typical use of this member might be to pop up a menu.
 
 \func{bool}{Realize}{\void}
 
-This function should be called after you have added tools. It
-calls, according to the implementation,
-either \helpref{wxToolBar::CreateTools}{wxtoolbarcreatetools} or
- \helpref{wxToolBar::Layout}{wxtoolbarlayout}.
+This function should be called after you have added tools.
 
 If you are using absolute positions for your tools when using a wxToolBarSimple object,
 do not call this function. You must call it at all other times.
