X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/605d715ddd84ddc3e78423e3f3ae5c27c8ff4d43..d1853d4765d02a9842c7a8721ef2329d09429262:/docs/latex/wx/outptstr.tex?ds=sidebyside

diff --git a/docs/latex/wx/outptstr.tex b/docs/latex/wx/outptstr.tex
index 6fec17cdfe..0eb87f886e 100644
--- a/docs/latex/wx/outptstr.tex
+++ b/docs/latex/wx/outptstr.tex
@@ -13,6 +13,8 @@ wxOutputStream is an abstract base class which may not be used directly.
 
 <wx/stream.h>
 
+\latexignore{\rtfignore{\wxheading{Members}}}
+
 % -----------
 % ctor & dtor
 % -----------
@@ -69,46 +71,3 @@ Reads data from the specified input stream and stores them
 in the current stream. The data is read until an error is raised
 by one of the two streams.
 
-% -----------------------------------------------------------------------------
-% wxCountingOutputStream
-% -----------------------------------------------------------------------------
-\section{\class{wxCountOutputStream}}\label{wxcountingoutputstream}
-
-wxCountingOutputStream is specialized output stream which does not write any data anyway,
-instead it counts how many bytes would get written if this were a normal stream. This
-can sometimes be useful or required if some data gets serialized to a stream or compressed
-by using stream compression and thus the final size of the stream cannot be known other
-than pretending to write the stream. One case where the resulting size would have to be
-known is if the data has to be written to a piece of memory and the memory has to be
-allocated before writing to it (which is probably always the case when writing to a 
-memory stream).
-
-\wxheading{Derived from}
-
-\helpref{wxOutputStream}{wxstreambase}
-\helpref{wxStreamBase}{wxstreambase}
-
-\wxheading{Include files}
-
-<wx/stream.h>
-
-% -----------
-% ctor & dtor
-% -----------
-\membersection{wxCountingOutputStream::wxCountingOutputStream}
-
-\func{}{wxCountingOutputStream}{\void}
-
-Creates a wxCountingOutputStream object.
-
-\membersection{wxCountingOutputStream::\destruct{wxCountingOutputStream}}
-
-\func{}{\destruct{wxCountingOutputStream}}{\void}
-
-Destructor.
-
-\membersection{wxCountingOutputStream::GetSize}
-
-\constfunc{size\_t}{GetSize}{\void}
-
-Returns the current size of the stream.
