X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/605d715ddd84ddc3e78423e3f3ae5c27c8ff4d43..cdfb1ae1bcacb8327589a09e6a67f8fc1ef5a82e:/docs/latex/wx/htdcrend.tex?ds=sidebyside

diff --git a/docs/latex/wx/htdcrend.tex b/docs/latex/wx/htdcrend.tex
index 7260505e0e..2ecfad889a 100644
--- a/docs/latex/wx/htdcrend.tex
+++ b/docs/latex/wx/htdcrend.tex
@@ -13,6 +13,10 @@ or \helpref{wxHtmlPrintout}{wxhtmlprintout} is strongly recommended.
 
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/html/htmprint.h>
+
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxHtmlDCRenderer::wxHtmlDCRenderer}\label{wxhtmldcrendererwxhtmldcrenderer}
@@ -33,7 +37,7 @@ inch wide on typical printer. With pixel\_scale = 3.0 it would be 3 inches.)
 
 \wxheading{Parameters}
 
-\docparam{maxwidth}{width of the area (on this DC) that is equivalent to screen's width, 
+\docparam{maxwidth}{width of the area (on this DC) that is equivalent to the screen's width, 
 in pixels (you should set it to page width minus margins). 
 
 {\bf Note:} In the current implementation
