X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/605d715ddd84ddc3e78423e3f3ae5c27c8ff4d43..9329312b60229511c24e59cf849fd6281ec4dc7b:/docs/latex/wx/htwindow.tex

diff --git a/docs/latex/wx/htwindow.tex b/docs/latex/wx/htwindow.tex
index ce72559e2c..2093c7c37b 100644
--- a/docs/latex/wx/htwindow.tex
+++ b/docs/latex/wx/htwindow.tex
@@ -62,6 +62,16 @@ Returns pointer to the top-level container.
 See also: \helpref{Cells Overview}{cells}, 
 \helpref{Printing Overview}{printing}
 
+\membersection{wxHtmlWindow::GetOpenedAnchor}\label{wxhtmlwindowgetopenedanchor}
+
+\func{wxString}{GetOpenedAnchor}{\void}
+
+Returns anchor within currently opened page
+(see \helpref{GetOpenedPage}{wxhtmlwindowgetopenedpage}). 
+If no page is opened or if the displayed page wasn't
+produced by call to LoadPage, empty string is returned.
+
+
 \membersection{wxHtmlWindow::GetOpenedPage}\label{wxhtmlwindowgetopenedpage}
 
 \func{wxString}{GetOpenedPage}{\void}
@@ -121,7 +131,7 @@ FALSE if an error occured, TRUE otherwise
 
 \membersection{wxHtmlWindow::OnLinkClicked}\label{wxhtmlwindowonlinkclicked}
 
-\func{virtual void}{OnLinkClicked}{\param{wxHtmlLinkInfo* }{link}}
+\func{virtual void}{OnLinkClicked}{\param{const wxHtmlLinkInfo& }{link}}
 
 Called when user clicks on hypertext link. Default behaviour is to call 
 \helpref{LoadPage}{wxhtmlwindowloadpage} and do nothing else.
