X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/605d715ddd84ddc3e78423e3f3ae5c27c8ff4d43..8b6e6947fc8fb946391740d66b140413eccb6b6c:/docs/latex/wx/inputstr.tex

diff --git a/docs/latex/wx/inputstr.tex b/docs/latex/wx/inputstr.tex
index 1df6d394dc..e830886624 100644
--- a/docs/latex/wx/inputstr.tex
+++ b/docs/latex/wx/inputstr.tex
@@ -13,6 +13,8 @@ wxInputStream is an abstract base class which may not be used directly.
 
 <wx/stream.h>
 
+\latexignore{\rtfignore{\wxheading{Members}}}
+
 % -----------
 % ctor & dtor
 % -----------
@@ -34,6 +36,12 @@ Destructor.
 
 Returns the first character in the input queue and removes it.
 
+\membersection{wxInputStream::Eof}\label{wxinputstreameof}
+
+\constfunc{wxInputStream}{Eof}{\void}
+
+Returns TRUE if the end of stream has been reached.
+
 \membersection{wxInputStream::LastRead}\label{wxinputstreamlastread}
 
 \constfunc{size\_t}{LastRead}{\void}
@@ -83,7 +91,7 @@ Changes the stream current position.
 
 Returns the current stream position.
 
-\membersection{wxInputStream::Ungetch}\label{wxinputstream_ungetch}
+\membersection{wxInputStream::Ungetch}\label{wxinputstreamungetch}
 
 \func{size\_t}{Ungetch}{\param{const char*}{ buffer}, \param{size\_t}{ size}}
 
