X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/605d715ddd84ddc3e78423e3f3ae5c27c8ff4d43..304b9d52cf2a01372ed0e83bd062812ad7d77c78:/docs/latex/wx/strmmem.tex

diff --git a/docs/latex/wx/strmmem.tex b/docs/latex/wx/strmmem.tex
index 920ad7b36e..64f28a1e5f 100644
--- a/docs/latex/wx/strmmem.tex
+++ b/docs/latex/wx/strmmem.tex
@@ -20,20 +20,32 @@
 % ----------
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxMemoryInputStream::wxMemoryInputStream}
+\membersection{wxMemoryInputStream::wxMemoryInputStream}\label{wxmemoryinputstreamctor}
 
 \func{}{wxMemoryInputStream}{\param{const char *}{ data}, \param{size\_t}{ len}}
 
 Initializes a new read-only memory stream which will use the specified buffer
 {\it data} of length {\it len}. The stream does not take ownership of the 
-buffer, i.e. that it will not delete in its destructor.
+buffer, i.e. the buffer will not be deleted in its destructor.
 
-\membersection{wxMemoryInputStream::\destruct{wxMemoryInputStream}}
+\func{}{wxMemoryInputStream}{\param{const wxMemoryOutputStream&}{ stream}}
+
+Creates a new read-only memory stream, initializing it with the
+data from the given output stream \arg{stream}.
+
+\membersection{wxMemoryInputStream::\destruct{wxMemoryInputStream}}\label{wxmemoryinputstreamdtor}
 
 \func{}{\destruct{wxMemoryInputStream}}{\void}
 
 Destructor.
 
+\membersection{wxMemoryInputStream::GetInputStreamBuffer}\label{wxmemoryinputstreamgetistrmbuf}
+
+\constfunc{wxStreamBuffer *}{GetInputStreamBuffer}{\void}
+
+Returns the pointer to the stream object used as an internal buffer
+for that stream.
+
 % -----------------------------------------------------------------------------
 % wxMemoryOutputStream
 % -----------------------------------------------------------------------------
@@ -56,7 +68,7 @@ Destructor.
 % ----------
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxMemoryOutputStream::wxMemoryOutputStream}
+\membersection{wxMemoryOutputStream::wxMemoryOutputStream}\label{wxmemoryoutputstreamctor}
 
 \func{}{wxMemoryOutputStream}{\param{char *}{ data = NULL}, \param{size\_t}{ length = 0}}
 
@@ -68,13 +80,13 @@ grow if required.
 If the buffer is created, it will be destroyed at the destruction of the
 stream.
 
-\membersection{wxMemoryOutputStream::\destruct{wxMemoryOutputStream}}
+\membersection{wxMemoryOutputStream::\destruct{wxMemoryOutputStream}}\label{wxmemoryoutputstreamdtor}
 
 \func{}{\destruct{wxMemoryOutputStream}}{\void}
 
 Destructor.
 
-\membersection{wxMemoryOutputStream::CopyTo}
+\membersection{wxMemoryOutputStream::CopyTo}\label{wxmemoryoutputstreamcopyto}
 
 \constfunc{size\_t}{CopyTo}{\param{char *}{buffer}, \param{size\_t }{len}}
 
@@ -87,3 +99,10 @@ the buffer.
 CopyTo returns the number of bytes copied to the buffer. Generally it is either
 len or the size of the stream buffer.
 
+\membersection{wxMemoryOutputStream::GetOutputStreamBuffer}\label{wxmemoryoutputstreamgetostrmbuf}
+
+\constfunc{wxStreamBuffer *}{GetOutputStreamBuffer}{\void}
+
+Returns the pointer to the stream object used as an internal buffer
+for that stream.
+
