X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5f3cd8a22a6abe2a47985fd00d00f173ac5167fc..94b49b9303a9fd119e24d1b07263f5bb0643afa5:/docs/latex/wx/config.tex?ds=sidebyside

diff --git a/docs/latex/wx/config.tex b/docs/latex/wx/config.tex
index 2b9abf764b..af679b31a5 100644
--- a/docs/latex/wx/config.tex
+++ b/docs/latex/wx/config.tex
@@ -2,9 +2,7 @@
 
 wxConfigBase class defines the basic interface of all config classes. It can
 not be used by itself (it's an abstract base class) and you'll always use one
-of its derivations: \helpref{wxIniConfig}{wxiniconfig},
-\helpref{wxFileConfig}{wxfileconfig}, \helpref{wxRegConfig}{wxregconfig} or
-any other.
+of its derivations: wxIniConfig, wxFileConfig, wxRegConfig or any other.
 
 However, usually you don't even need to know the precise nature of the class
 you're working with but you would just use the wxConfigBase methods. This
@@ -547,7 +545,7 @@ Reads a double value, returning TRUE if the value was found. If the value was
 not found, {\it d} is not changed.
 
 \constfunc{bool}{Read}{\param{const wxString\& }{ key}, \param{double*}{ d},
-\param{double}{ defaultVal}}
+ \param{double}{ defaultVal}}
 
 Reads a double value, returning TRUE if the value was found. If the value was
 not found, {\it defaultVal} is used instead.
