X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5ef2e6333e6355ac6c925b07909408a631c5ee26..0b165ed6b209ea9f5ddd7bfb1813c6f0718a9a3d:/docs/latex/wx/toolbar.tex

diff --git a/docs/latex/wx/toolbar.tex b/docs/latex/wx/toolbar.tex
index 39465088d1..486ae32798 100644
--- a/docs/latex/wx/toolbar.tex
+++ b/docs/latex/wx/toolbar.tex
@@ -168,12 +168,16 @@ Adds a separator for spacing groups of tools.
 
 \membersection{wxToolBar::AddTool}\label{wxtoolbaraddtool}
 
+\func{wxToolBarTool*}{AddTool}{\param{int}{ toolId}, \param{const wxBitmap\&}{ bitmap1},\rtfsp
+\param{const wxString\& }{shortHelpString = ""}, \param{const wxString\& }{longHelpString = ""}}
+
 \func{wxToolBarTool*}{AddTool}{\param{int}{ toolId}, \param{const wxBitmap\&}{ bitmap1},\rtfsp
 \param{const wxBitmap\&}{ bitmap2 = wxNullBitmap}, \param{bool}{ isToggle = FALSE},\rtfsp
 \param{long}{ xPos = -1}, \param{long}{ yPos = -1},\rtfsp
 \param{wxObject* }{clientData = NULL}, \param{const wxString\& }{shortHelpString = ""}, \param{const wxString\& }{longHelpString = ""}}
 
-Adds a tool to the toolbar.
+Adds a tool to the toolbar. The first (short and most commonly used) version
+adds a normal (and not a togglable) button without any associated client data.
 
 \wxheading{Parameters}
 
@@ -251,6 +255,9 @@ Enables or disables the tool.
 
 \docparam{enable}{If TRUE, enables the tool, otherwise disables it.}
 
+{\bf NB:} This function should only be called after 
+\helpref{Realize}{wxtoolbarrealize}.
+
 \wxheading{Remarks}
 
 For wxToolBarSimple, does nothing. Some other implementations
@@ -450,7 +457,7 @@ You must call \helpref{Realize}{wxtoolbarrealize} for the change to take place.
 \membersection{wxToolBar::InsertTool}\label{wxtoolbarinserttool}
 
 \func{wxToolBarTool *}{InsertTool}{\param{size\_t }{pos},\rtfsp
-{\param{int}{ toolId}, \param{const wxBitmap\&}{ bitmap1},\rtfsp
+\param{int}{ toolId}, \param{const wxBitmap\&}{ bitmap1},\rtfsp
 \param{const wxBitmap\&}{ bitmap2 = wxNullBitmap}, \param{bool}{ isToggle = FALSE},\rtfsp
 \param{wxObject* }{clientData = NULL}, \param{const wxString\& }{shortHelpString = ""}, \param{const wxString\& }{longHelpString = ""}}
 
@@ -544,10 +551,7 @@ A typical use of this member might be to pop up a menu.
 
 \func{bool}{Realize}{\void}
 
-This function should be called after you have added tools. It
-calls, according to the implementation,
-either \helpref{wxToolBar::CreateTools}{wxtoolbarcreatetools} or
- \helpref{wxToolBar::Layout}{wxtoolbarlayout}.
+This function should be called after you have added tools.
 
 If you are using absolute positions for your tools when using a wxToolBarSimple object,
 do not call this function. You must call it at all other times.
@@ -566,6 +570,31 @@ change to take place, it will happen immediately.
 
 \helpref{DeleteTool}{wxtoolbardeletetool}
 
+\membersection{wxToolBar::SetMargins}\label{wxtoolbarsetmargins}
+
+\func{void}{SetMargins}{\param{const wxSize\&}{ size}}
+
+\func{void}{SetMargins}{\param{int}{ x}, \param{int}{ y}}
+
+Set the values to be used as margins for the toolbar.
+
+\wxheading{Parameters}
+
+\docparam{size}{Margin size.}
+
+\docparam{x}{Left margin, right margin and inter-tool separation value.}
+
+\docparam{y}{Top margin, bottom margin and inter-tool separation value.}
+
+\wxheading{Remarks}
+
+This must be called before the tools are added if absolute positioning is to be used, and the
+default (zero-size) margins are to be overridden.
+
+\wxheading{See also}
+
+\helpref{wxToolBar::GetMargins}{wxtoolbargetmargins}, \helpref{wxSize}{wxsize}
+
 \membersection{wxToolBar::SetToolBitmapSize}\label{wxtoolbarsettoolbitmapsize}
 
 \func{void}{SetToolBitmapSize}{\param{const wxSize\&}{ size}}
@@ -589,30 +618,11 @@ and not the eventual size of the tool button.
 \helpref{wxToolBar::GetToolBitmapSize}{wxtoolbargettoolbitmapsize},\rtfsp
 \helpref{wxToolBar::GetToolSize}{wxtoolbargettoolsize}
 
-\membersection{wxToolBar::SetMargins}\label{wxtoolbarsetmargins}
+\membersection{wxToolBar::SetToolClientData}\label{wxtoolbarsettoolclientdata}
 
-\func{void}{SetMargins}{\param{const wxSize\&}{ size}}
-
-\func{void}{SetMargins}{\param{int}{ x}, \param{int}{ y}}
-
-Set the values to be used as margins for the toolbar.
-
-\wxheading{Parameters}
-
-\docparam{size}{Margin size.}
+\func{void}{GetToolClientData}{\param{wxObject* }{clientData}}
 
-\docparam{x}{Left margin, right margin and inter-tool separation value.}
-
-\docparam{y}{Top margin, bottom margin and inter-tool separation value.}
-
-\wxheading{Remarks}
-
-This must be called before the tools are added if absolute positioning is to be used, and the
-default (zero-size) margins are to be overridden.
-
-\wxheading{See also}
-
-\helpref{wxToolBar::GetMargins}{wxtoolbargetmargins}, \helpref{wxSize}{wxsize}
+Sets the client data associated with the tool.
 
 \membersection{wxToolBar::SetToolLongHelp}\label{wxtoolbarsettoollonghelp}
 
