X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5e06d749ed2e8fe82bf058e66695cd4a96e450da..3bfa7be9771e14a164116fa2081171bcab17814f:/docs/latex/wx/window.tex?ds=inline

diff --git a/docs/latex/wx/window.tex b/docs/latex/wx/window.tex
index 41f51d579f..e81083f2aa 100644
--- a/docs/latex/wx/window.tex
+++ b/docs/latex/wx/window.tex
@@ -1327,6 +1327,13 @@ Returns {\tt true} if this window has the current mouse capture.
 \helpref{wxMouseCaptureChangedEvent}{wxmousecapturechangedevent}
 
 
+\membersection{wxWindow::HasFlag}\label{wxwindowhasflag}
+
+\constfunc{bool}{HasFlag}{\param{int }{flag}}
+
+Returns \texttt{true} if the window has the given \arg{flag} bit set.
+
+
 \membersection{wxWindow::HasScrollbar}\label{wxwindowhasscrollbar}
 
 \constfunc{virtual bool}{HasScrollbar}{\param{int }{orient}}
