X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5de76427c87d8289f5c343cef16e9375056fc49f..a294c6d53ed8be5b92c31e1eb7e3366ba1642fa7:/docs/latex/wx/gauge.tex

diff --git a/docs/latex/wx/gauge.tex b/docs/latex/wx/gauge.tex
index 6e9d9f61c5..4bb96aa747 100644
--- a/docs/latex/wx/gauge.tex
+++ b/docs/latex/wx/gauge.tex
@@ -10,6 +10,10 @@ There are no user commands for the gauge.
 \helpref{wxEvtHandler}{wxEvtHandler}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/gauge.h>
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
@@ -17,6 +21,7 @@ There are no user commands for the gauge.
 \twocolitem{\windowstyle{wxGA\_HORIZONTAL}}{Creates a horizontal gauge.}
 \twocolitem{\windowstyle{wxGA\_VERTICAL}}{Creates a vertical gauge.}
 \twocolitem{\windowstyle{wxGA\_PROGRESSBAR}}{Under Windows 95, creates a horizontal progress bar.}
+\twocolitem{\windowstyle{wxGA\_SMOOTH}}{Under Windows 95, creates smooth progress bar with one pixel wide update step.}
 \end{twocollist}
 
 See also \helpref{window styles overview}{windowstyles}.
