X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5de76427c87d8289f5c343cef16e9375056fc49f..9b386ecadb0f98fb92cfaad786dcc26915a070bd:/docs/latex/wx/button.tex

diff --git a/docs/latex/wx/button.tex b/docs/latex/wx/button.tex
index 4b92248274..92dcfb225f 100644
--- a/docs/latex/wx/button.tex
+++ b/docs/latex/wx/button.tex
@@ -12,9 +12,21 @@ almost any other window.
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/button.h>
+
 \wxheading{Window styles}
 
-There are no special styles for wxButton.
+\twocolwidtha{5cm}%
+\begin{twocollist}\itemsep=0pt
+\twocolitem{\windowstyle{wxBU\_LEFT}}{Left-justifies the label. Windows only.}
+\twocolitem{\windowstyle{wxBU\_TOP}}{Aligns the label to the top of the button. Windows only.}
+\twocolitem{\windowstyle{wxBU\_RIGHT}}{Right-justifies the bitmap label. Windows only.}
+\twocolitem{\windowstyle{wxBU\_BOTTOM}}{Aligns the label to the bottom of the button. Windows only.}
+\twocolitem{\windowstyle{wxBU\_EXACTFIT}}{Creates the button as small as possible instead of making it of the standard size (which is the default behaviour ).}
+\twocolitem{\windowstyle{wxNO\_BORDER}}{Creates a flat button. Windows and GTK+ only.}
+\end{twocollist}
 
 See also \helpref{window styles overview}{windowstyles}.
 
@@ -95,6 +107,14 @@ The button's label.
 
 \helpref{wxButton::SetLabel}{wxbuttonsetlabel}
 
+\membersection{wxButton::GetDefaultSize}\label{wxbuttongetdefaultsize}
+
+\func{wxSize}{GetDefaultSize}{\void}
+
+Returns the default size for the buttons. It is advised to make all the dialog
+buttons of the same size and this function allows to retrieve the (platform and
+current font dependent size) which should be the best suited for this.
+
 \membersection{wxButton::SetDefault}\label{wxbuttonsetdefault}
 
 \func{void}{SetDefault}{\void}
@@ -108,13 +128,13 @@ Under Windows, only dialog box buttons respond to this function.  As
 normal under Windows and Motif, pressing return causes the default button to
 be depressed when the return key is pressed. See also \helpref{wxWindow::SetFocus}{wxwindowsetfocus}\rtfsp
 which sets the keyboard focus for windows and text panel items,\rtfsp
-and \helpref{wxWindow::GetDefaultItem}{wxwindowgetdefaultitem}.
+and \helpref{wxPanel::SetDefaultItem}{wxpanelsetdefaultitem}.
 
 Note that under Motif, calling this function immediately after
 creation of a button and before the creation of other buttons
 will cause misalignment of the row of buttons, since default
 buttons are larger. To get around this, call {\it SetDefault}\rtfsp
-after you have created a row of buttons: wxWindows will
+after you have created a row of buttons: wxWidgets will
 then set the size of all buttons currently on the panel to
 the same size.
 
