X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5de76427c87d8289f5c343cef16e9375056fc49f..3e9af289ed81a98bbbf9bb183d0ed03ac627ba32:/docs/latex/wx/scrolbar.tex

diff --git a/docs/latex/wx/scrolbar.tex b/docs/latex/wx/scrolbar.tex
index 89526994eb..955134b7bc 100644
--- a/docs/latex/wx/scrolbar.tex
+++ b/docs/latex/wx/scrolbar.tex
@@ -12,6 +12,10 @@ events are received.
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/scrolbar.h>
+
 \wxheading{Remarks}
 
 A scrollbar has the following main attributes: {\it range}, {\it thumb size}, {\it page size}, and {\it position}.
@@ -45,22 +49,7 @@ to the size of the window and the size of the data.
 
 See also \helpref{window styles overview}{windowstyles}.
 
-\wxheading{Event handling}
-
-To process input from a scrollbar, use one of these event handler macros to direct input to member
-functions that take a \helpref{wxScrollEvent}{wxscrollevent} argument:
-
-\twocolwidtha{7cm}
-\begin{twocollist}
-\twocolitem{{\bf EVT\_COMMAND\_SCROLL(id, func)}}{Catch all scroll commands.}
-\twocolitem{{\bf EVT\_COMMAND\_TOP(id, func)}}{Catch a command to put the scroll thumb at the maximum position.}
-\twocolitem{{\bf EVT\_COMMAND\_BOTTOM(id, func)}}{Catch a command to put the scroll thumb at the maximum position.}
-\twocolitem{{\bf EVT\_COMMAND\_LINEUP(id, func)}}{Catch a line up command.}
-\twocolitem{{\bf EVT\_COMMAND\_LINEDOWN(id, func)}}{Catch a line down command.}
-\twocolitem{{\bf EVT\_COMMAND\_PAGEUP(id, func)}}{Catch a page up command.}
-\twocolitem{{\bf EVT\_COMMAND\_PAGEDOWN(id, func)}}{Catch a page down command.}
-\twocolitem{{\bf EVT\_COMMAND\_THUMBTRACK(id, func)}}{Catch a thumbtrack command (continuous movement of the scroll thumb).}
-\end{twocollist}%
+\input scrolevt.inc
 
 \wxheading{See also}
 
@@ -141,15 +130,15 @@ same as the thumb size.
 
 \helpref{wxScrollBar::SetScrollbar}{wxscrollbarsetscrollbar}
 
-\membersection{wxScrollBar::GetPosition}\label{wxscrollbargetposition}
+\membersection{wxScrollBar::GetThumbPosition}\label{wxscrollbargetthumbposition}
 
-\constfunc{int}{GetPosition}{\void}
+\constfunc{int}{GetThumbPosition}{\void}
 
-Returns the current position of the scrollbar.
+Returns the current position of the scrollbar thumb.
 
 \wxheading{See also}
 
-\helpref{wxScrollBar::SetPosition}{wxscrollbarsetposition}
+\helpref{wxScrollBar::SetThumbPosition}{wxscrollbarsetthumbposition}
 
 \membersection{wxScrollBar::GetThumbLength}\label{wxscrollbargetthumblength}
 
@@ -207,9 +196,9 @@ At present, this needs to be called {\it before} other set functions.
 \helpref{wxScrollBar::GetPageSize}{wxscrollbargetpagesize}
 \end{comment}
 
-\membersection{wxScrollBar::SetPosition}\label{wxscrollbarsetposition}
+\membersection{wxScrollBar::SetThumbPosition}\label{wxscrollbarsetthumbposition}
 
-\func{void}{SetPosition}{\param{int}{ viewStart}}
+\func{void}{SetThumbPosition}{\param{int}{ viewStart}}
 
 Sets the position of the scrollbar.
 
@@ -219,14 +208,14 @@ Sets the position of the scrollbar.
 
 \wxheading{See also}
 
-\helpref{wxScrollBar::GetPosition}{wxscrollbargetposition}
+\helpref{wxScrollBar::GetThumbPosition}{wxscrollbargetthumbposition}
 
 \membersection{wxScrollBar::SetScrollbar}\label{wxscrollbarsetscrollbar}
 
 \func{virtual void}{SetScrollbar}{\param{int }{position},\rtfsp
 \param{int }{thumbSize}, \param{int }{range},\rtfsp
 \param{int }{pageSize},\rtfsp
-\param{const bool }{refresh = TRUE}}
+\param{const bool }{refresh = true}}
 
 Sets the scrollbar properties.
 
@@ -242,7 +231,7 @@ Sets the scrollbar properties.
 the scrollbar will scroll when it is paged up or down. Often it is the same as
 the thumb size.}
 
-\docparam{refresh}{TRUE to redraw the scrollbar, FALSE otherwise.}
+\docparam{refresh}{true to redraw the scrollbar, false otherwise.}
 
 \wxheading{Remarks}
 
@@ -270,7 +259,7 @@ When defining your own scrollbar behaviour, you will always need to recalculate
 the scrollbar settings when the window size changes. You could therefore put your
 scrollbar calculations and SetScrollbar
 call into a function named AdjustScrollbars, which can be called initially and also
-from a \helpref{wxWindow::OnSize}{wxwindowonsize} event handler function.
+from a \helpref{wxSizeEvent}{wxsizeevent} event handler function.
 
 \wxheading{See also}
 
