X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5d76f4628261a5d80ca18e45b311efa2e79f3d57..21dc4be5d27fd73cda55795ab9d1e7e02b494c46:/docs/latex/wx/flexsizr.tex?ds=inline

diff --git a/docs/latex/wx/flexsizr.tex b/docs/latex/wx/flexsizr.tex
index 0ce1e99fe4..c161b8fafa 100644
--- a/docs/latex/wx/flexsizr.tex
+++ b/docs/latex/wx/flexsizr.tex
@@ -6,10 +6,10 @@ height and all fields in one column having the same width, but all
 rows or all columns are not necessarily the same height or width as in
 the \helpref{wxGridSizer}{wxgridsizer}.
 
-Since wxWindows 2.5.0, wxFlexGridSizer can also size items equally in one
+Since wxWidgets 2.5.0, wxFlexGridSizer can also size items equally in one
 direction but unequally ("flexibly") in the other. If the sizer is only
 flexible in one direction (this can be changed using 
-\helpref{SetFlexibleDrection}{wxflexgridsizersetflexibledrection}),
+\helpref{SetFlexibleDrection}{wxflexgridsizersetflexibledirection}),
 it needs to be decided how the sizer should grow in the other ("non flexible")
 direction in order to fill the available space. The 
 \helpref{SetNonFlexibleGrowMode}{wxflexgridsizersetnonflexiblegrowmode} method
@@ -21,10 +21,15 @@ serves this purpose.
 \helpref{wxSizer}{wxsizer}\\
 \helpref{wxObject}{wxobject}
 
+\wxheading{Include files}
+
+<wx/sizer.h>
+
 \wxheading{See also}
 
 \helpref{wxSizer}{wxsizer}, \helpref{Sizer overview}{sizeroverview}
 
+\latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxFlexGridSizer::wxFlexGridSizer}\label{wxflexgridsizerwxflexgridsizer}
 
@@ -41,18 +46,25 @@ all children.
 
 \membersection{wxFlexGridSizer::AddGrowableCol}\label{wxflexgridsizeraddgrowablecol}
 
-\func{void}{AddGrowableCol}{\param{size\_t }{idx}}
+\func{void}{AddGrowableCol}{\param{size\_t }{idx}, \param{int }{proportion = $0$}}
 
-Specifies that column idx (starting from zero) should be grown if
+Specifies that column {\it idx} (starting from zero) should be grown if
 there is extra space available to the sizer.
 
+The {\it proportion} parameter has the same meaning as the stretch factor for
+the \helpref{sizers}{sizeroverview} except that if all proportions are $0$,
+then all columns are resized equally (instead of not being resized at all).
+
 \membersection{wxFlexGridSizer::AddGrowableRow}\label{wxflexgridsizeraddgrowablerow}
 
-\func{void}{AddGrowableRow}{\param{size\_t }{idx}}
+\func{void}{AddGrowableRow}{\param{size\_t }{idx}, \param{int }{proportion = $0$}}
 
 Specifies that row idx (starting from zero) should be grown if there
 is extra space available to the sizer.
 
+See \helpref{AddGrowableCol}{wxflexgridsizeraddgrowablecol} for the description
+of {\it proportion} parameter.
+
 \membersection{wxFlexGridSizer::GetFlexibleDirection}\label{wxflexgridsizergetflexibledrection}
 
 \constfunc{int}{GetFlexibleDirections}{\void}
@@ -72,7 +84,7 @@ One of the following values:
 
 \wxheading{See also}
 
-\helpref{SetFlexibleDrection}{wxflexgridsizersetflexibledrection}
+\helpref{SetFlexibleDrection}{wxflexgridsizersetflexibledirection}
 
 
 \membersection{wxFlexGridSizer::GetNonFlexibleGrowMode}\label{wxflexgridsizergetnonflexiblegrowmode}
@@ -94,13 +106,13 @@ One of the following values:
 In this case equal sizing applies to minimum sizes of columns or
 rows (this is the default value).}
 \twocolitem{wxFLEX\_GROWMODE\_ALL}{Sizer equally stretches all columns or rows
-in the non flexible direction, whether they are growable or not in the flexbile
+in the non flexible direction, whether they are growable or not in the flexible
 direction.}
 \end{twocollist}
 
 \wxheading{See also}
 
-\helpref{SetFlexibleDrection}{wxflexgridsizersetflexibledrection}, 
+\helpref{SetFlexibleDrection}{wxflexgridsizersetflexibledirection}, 
 \helpref{SetNonFlexibleGrowMode}{wxflexgridsizersetnonflexiblegrowmode}
 
 
@@ -118,12 +130,12 @@ Specifies that column idx is no longer growable.
 Specifies that row idx is no longer growable.
 
 
-\membersection{wxFlexGridSizer::SetFlexibleDirection}{wxflexgridsizersetflexibledrection}
+\membersection{wxFlexGridSizer::SetFlexibleDirection}\label{wxflexgridsizersetflexibledirection}
 
 \func{void}{SetFlexibleDirections}{\param{int }{direction}}
 
 Specifies whether the sizer should flexibly resize its columns, rows, or
-both. Argument {\t direction} can be {\tt wxVERTICAL}, {\tt wxHORIZONTAL} 
+both. Argument {\tt direction} can be {\tt wxVERTICAL}, {\tt wxHORIZONTAL} 
 or {\tt wxBOTH} (which is the default value). Any other value is ignored. See
 \helpref{GetFlexibleDirection()}{wxflexgridsizergetflexibledrection} for the
 explanation of these values.
@@ -131,13 +143,13 @@ explanation of these values.
 Note that this method does not trigger relayout.
 
 
-\membersection{wxFlexGridSizer::SetNonFlexibleGrowMode}{wxflexgridsizersetnonflexiblegrowmode}
+\membersection{wxFlexGridSizer::SetNonFlexibleGrowMode}\label{wxflexgridsizersetnonflexiblegrowmode}
 
-\func{void}{SetNonFlexibleGrowMode}{\param{int }{mode}}
+\func{void}{SetNonFlexibleGrowMode}{\param{wxFlexSizerGrowMode }{mode}}
 
 Specifies how the sizer should grow in the non flexible direction if
 there is one (so
-\helpref{SetFlexibleDirections()}{wxflexgridsizersetflexibledrection} must have
+\helpref{SetFlexibleDirections()}{wxflexgridsizersetflexibledirection} must have
 been called previously). Argument {\it mode} can be one of those documented in
 \helpref{GetNonFlexibleGrowMode}{wxflexgridsizergetnonflexiblegrowmode}, please
 see there for their explanation.
