X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5c04afea29acb153055ba4cde96d0eaa9ab4fef3..2712e31795ee7ab4de62189b440d702f3f849c0d:/docs/latex/wx/dataviewindexlistmodel.tex

diff --git a/docs/latex/wx/dataviewindexlistmodel.tex b/docs/latex/wx/dataviewindexlistmodel.tex
index c334f0e6a0..a83d691c57 100644
--- a/docs/latex/wx/dataviewindexlistmodel.tex
+++ b/docs/latex/wx/dataviewindexlistmodel.tex
@@ -73,6 +73,16 @@ Returns the position of given {\it item}.
 
 Override this to allow getting values from the model.
 
+
+\membersection{wxDataViewIndexListModel::Reset}\label{wxdataviewindexlistmodelreset}
+
+\func{void}{Reset}{\param{unsigned int }{new\_size}}
+
+Call this after if the data has to be read again from
+the model. This is useful after major changes when
+calling the methods below (possibly thousands of times)
+doesn't make sense.
+
 \membersection{wxDataViewIndexListModel::RowAppended}\label{wxdataviewindexlistmodelrowappended}
 
 \func{void}{RowAppended}{\void}
@@ -91,6 +101,14 @@ Call this after a row has been changed.
 
 Call this after a row has been deleted.
 
+\membersection{wxDataViewIndexListModel::RowsDeleted}\label{wxdataviewindexlistmodelrowdeleted}
+
+\func{void}{RowsDeleted}{\param{const wxArrayInt &}{rows}}
+
+Call this after rows have been deleted. The array will internally
+get copied and sorted in descending order so that the rows with
+the highest position will be deleted first.
+
 \membersection{wxDataViewIndexListModel::RowInserted}\label{wxdataviewindexlistmodelrowinserted}
 
 \func{void}{RowInserted}{\param{unsigned int }{before}}
