X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5bb31e3561ca74ee3e1e5f3293ed3201c33dcce8..bc253a97e78b2c42b93c1f3cc8e1bcceec68a336:/docs/latex/wx/dynlib.tex

diff --git a/docs/latex/wx/dynlib.tex b/docs/latex/wx/dynlib.tex
index 6712c0b87d..61accb8f3d 100644
--- a/docs/latex/wx/dynlib.tex
+++ b/docs/latex/wx/dynlib.tex
@@ -6,7 +6,7 @@
 %% Created:     14.01.02 (extracted from dllload.tex)
 %% RCS-ID:      $Id$
 %% Copyright:   (c) Vadim Zeitlin
-%% License:     wxWindows license
+%% License:     wxWidgets license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxDynamicLibrary}}\label{wxdynamiclibrary}
@@ -56,7 +56,7 @@ The possible values for \arg{cat} are:
 \func{wxString}{CanonicalizePluginName}{\param{const wxString\& }{name}, \param{wxPluginCategory}{ cat = wxDL\_PLUGIN\_GUI}}
 
 This function does the same thing as 
-\helpref{CanonicalizeName}{wxdynamiclibrarycanonicalizename} but for wxWindows
+\helpref{CanonicalizeName}{wxdynamiclibrarycanonicalizename} but for wxWidgets
 plugins. The only difference is that compiler and version information are added
 to the name to ensure that the plugin which is going to be loaded will be
 compatible with the main program.
@@ -99,6 +99,7 @@ Returns \true if the library was successfully loaded, \false otherwise.
 
 Loads DLL with the given \arg{name} into memory. The \arg{flags} argument can
 be a combination of the following bits:
+
 \begin{twocollist}
 \twocolitem{wxDL\_LAZY}{equivalent of RTLD\_LAZY under Unix, ignored elsewhere}
 \twocolitem{wxDL\_NOW}{equivalent of RTLD\_NOW under Unix, ignored elsewhere}
