X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5b9003ae3213f487fa3be74804b426a8ad0db323..42d9ad7949254ed53f89ad6306dcb2a266bfffb3:/docs/latex/wx/imaglist.tex?ds=inline

diff --git a/docs/latex/wx/imaglist.tex b/docs/latex/wx/imaglist.tex
index 6b71f3a53e..697aad2ea1 100644
--- a/docs/latex/wx/imaglist.tex
+++ b/docs/latex/wx/imaglist.tex
@@ -16,6 +16,10 @@ wxImageList is used principally in conjunction with \helpref{wxTreeCtrl}{wxtreec
 
 <wx/imaglist.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxTreeCtrl}{wxtreectrl}, \helpref{wxListCtrl}{wxlistctrl}
@@ -28,7 +32,7 @@ wxImageList is used principally in conjunction with \helpref{wxTreeCtrl}{wxtreec
 
 Default constructor.
 
-\func{}{wxImageList}{\param{int }{width}, \param{int }{height}, \param{const bool }{mask = true},\rtfsp
+\func{}{wxImageList}{\param{int }{width}, \param{int }{height}, \param{bool }{mask = true},\rtfsp
 \param{int }{initialCount = 1}}
 
 Constructor specifying the image size, whether image masks should be created, and the initial size of the list.
@@ -91,7 +95,7 @@ implements the following methods:\par
 }
 \membersection{wxImageList::Create}\label{wximagelistcreate}
 
-\func{bool}{Create}{\param{int }{width}, \param{int }{height}, \param{const bool }{mask = true},\rtfsp
+\func{bool}{Create}{\param{int }{width}, \param{int }{height}, \param{bool }{mask = true},\rtfsp
 \param{int }{initialCount = 1}}
 
 Initializes the list. See \helpref{wxImageList::wxImageList}{wximagelistconstr} for details.
@@ -100,7 +104,7 @@ Initializes the list. See \helpref{wxImageList::wxImageList}{wximagelistconstr}
 
 \func{bool}{Draw}{\param{int}{ index}, \param{wxDC\&}{ dc}, \param{int }{x},\rtfsp
 \param{int }{y}, \param{int }{flags = wxIMAGELIST\_DRAW\_NORMAL},\rtfsp
-\param{const bool }{solidBackground = false}}
+\param{bool }{solidBackground = false}}
 
 Draws a specified image onto a device context.
 
