X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5b5035ce5b432a4535a830debcb8ed26b7e1ec7b..78382290bba64efb350fd9b66d48553491d78115:/docs/latex/wx/dc.tex

diff --git a/docs/latex/wx/dc.tex b/docs/latex/wx/dc.tex
index ef70d00a79..7a2a77b2a3 100644
--- a/docs/latex/wx/dc.tex
+++ b/docs/latex/wx/dc.tex
@@ -504,12 +504,15 @@ the rectangle.
 
 \membersection{wxDC::DrawSpline}\label{wxdcdrawspline}
 
+\func{void}{DrawSpline}{\param{int }{n}, \param{wxPoint }{points[]}}
+
+Draws a spline between all given control points, using the current
+pen.
+
 \func{void}{DrawSpline}{\param{wxList *}{points}}
 
 Draws a spline between all given control points, using the current
-pen.  Doesn't delete the wxList and contents. The spline is drawn
-using a series of lines, using an algorithm taken from the X drawing
-program `XFIG'.
+pen.  Doesn't delete the wxList and contents.
 
 \func{void}{DrawSpline}{\param{wxCoord}{ x1}, \param{wxCoord}{ y1}, \param{wxCoord}{ x2}, \param{wxCoord}{ y2}, \param{wxCoord}{ x3}, \param{wxCoord}{ y3}}
 
@@ -904,8 +907,8 @@ doesn't contain anything.
                                 \param{bool}{ yBottomUp}}
 
 Sets the x and y axis orientation (i.e., the direction from lowest to
-highest values on the axis). The default orientation is the natural
-orientation, e.g. x axis from left to right and y axis from bottom up.
+highest values on the axis). The default orientation is 
+x axis from left to right and y axis from top down.
 
 \wxheading{Parameters}
 
