X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5a30d45018a98ee9355c9585dbc1cdfe07aeb2d2..5125ea1f83ee0b64c6e26c17823f6e389f7b633f:/docs/latex/wx/gbspan.tex?ds=inline

diff --git a/docs/latex/wx/gbspan.tex b/docs/latex/wx/gbspan.tex
index 63c3b25792..5cba4474be 100644
--- a/docs/latex/wx/gbspan.tex
+++ b/docs/latex/wx/gbspan.tex
@@ -52,7 +52,7 @@ Set a new rowspan value.
 
 \constfunc{bool}{operator!}{\param{const wxGBSpan\& }{o}}
 
-Is the wxGBSpan valid?  (An invalid wxGBPosition is (-1,-1). )
+Is the wxGBSpan valid?  (An invalid wxGBSpan is (-1,-1). )
 
 \membersection{wxGBSpan::operator==}\label{wxgbspanoperatorequal}
 
