X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5a30d45018a98ee9355c9585dbc1cdfe07aeb2d2..038c03337f139d64f99d3334edfd1aa08354d9f0:/docs/latex/wx/gbspan.tex?ds=sidebyside

diff --git a/docs/latex/wx/gbspan.tex b/docs/latex/wx/gbspan.tex
index 63c3b25792..6b3b147409 100644
--- a/docs/latex/wx/gbspan.tex
+++ b/docs/latex/wx/gbspan.tex
@@ -12,6 +12,10 @@ No base class
 
 <wx/gbsizer.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxGBSpan::wxGBSpan}\label{wxgbspanwxgbspan}
@@ -52,7 +56,7 @@ Set a new rowspan value.
 
 \constfunc{bool}{operator!}{\param{const wxGBSpan\& }{o}}
 
-Is the wxGBSpan valid?  (An invalid wxGBPosition is (-1,-1). )
+Is the wxGBSpan valid?  (An invalid wxGBSpan is (-1,-1). )
 
 \membersection{wxGBSpan::operator==}\label{wxgbspanoperatorequal}
 
