X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/58e8013e8217e36a4bdf38e6dbad3b21edf61af6..3cc305b2b4a0674c56c84d7088cfd70676b850f0:/docs/latex/wx/collpane.tex

diff --git a/docs/latex/wx/collpane.tex b/docs/latex/wx/collpane.tex
index 8b8d412c79..f98b96e5aa 100644
--- a/docs/latex/wx/collpane.tex
+++ b/docs/latex/wx/collpane.tex
@@ -56,6 +56,10 @@ It is only available if \texttt{wxUSE\_COLLPANE} is set to $1$ (the default).
 
 <wx/collpane.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}%
@@ -188,6 +192,10 @@ This event class is used for the events generated by
 
 <wx/collpane.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Event handling}
 
 To process input from a wxCollapsiblePane, use one of these event handler macros to
