X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/588066b7a39629e44bb39f1ab436b80f38c13f33..af44de02aea93529c5a42199d96feb9de8fa5a21:/docs/latex/wx/strmbase.tex?ds=sidebyside

diff --git a/docs/latex/wx/strmbase.tex b/docs/latex/wx/strmbase.tex
index 1e7f6d824e..4fe1264b2b 100644
--- a/docs/latex/wx/strmbase.tex
+++ b/docs/latex/wx/strmbase.tex
@@ -72,7 +72,7 @@ This function returns the last error.
 
 \constfunc{size\_t}{GetSize}{\void}
 
-\deprecated{\helpref{GetLength}{wxstreambasegetlength}}
+\helpref{GetLength}{wxstreambasegetlength}
 
 This function returns the size of the stream. For example, for a file it is the
 size of the file.
@@ -85,7 +85,7 @@ In that cases, GetSize returns $0$ so you should always test its return value.
 
 \membersection{wxStreamBase::IsOk}\label{wxstreambaseisok}
 
-\constfunc{wxStreamError}{IsOk}{\void}
+\constfunc{bool}{IsOk}{\void}
 
 Returns true if no error occurred on the stream.
 
