X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/588066b7a39629e44bb39f1ab436b80f38c13f33..ab9d0a8ca3d306898d92960ecfaefb8c1191b18a:/docs/latex/wx/strmbase.tex

diff --git a/docs/latex/wx/strmbase.tex b/docs/latex/wx/strmbase.tex
index 1e7f6d824e..54ea88732c 100644
--- a/docs/latex/wx/strmbase.tex
+++ b/docs/latex/wx/strmbase.tex
@@ -72,7 +72,7 @@ This function returns the last error.
 
 \constfunc{size\_t}{GetSize}{\void}
 
-\deprecated{\helpref{GetLength}{wxstreambasegetlength}}
+\helpref{GetLength}{wxstreambasegetlength}
 
 This function returns the size of the stream. For example, for a file it is the
 size of the file.
