<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/588066b7a39629e44bb39f1ab436b80f38c13f33..2712e31795ee7ab4de62189b440d702f3f849c0d:/docs/latex/wx/strmbase.tex

diff --git a/docs/latex/wx/strmbase.tex b/docs/latex/wx/strmbase.tex
index 1e7f6d824e..57f20bf291 100644
--- a/docs/latex/wx/strmbase.tex
+++ b/docs/latex/wx/strmbase.tex
@@ -14,6 +14,10 @@ None
 
 &lt;wx/stream.h&gt;
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxStreamBuffer}{wxstreambuffer}
@@ -47,7 +51,7 @@ Destructor.
 \constfunc{wxFileOffset}{GetLength}{\void}
 
 Returns the length of the stream in bytes. If the length cannot be determined
-(this is always the case for socket streams for example), returns
+(this is always the case for socket streams for example), returns 
 \texttt{wxInvalidOffset}.
 
 \newsince{2.5.4}
@@ -72,7 +76,7 @@ This function returns the last error.
 
 \constfunc{size\_t}{GetSize}{\void}
 
-\deprecated{\helpref{GetLength}{wxstreambasegetlength}}
+\helpref{GetLength}{wxstreambasegetlength}
 
 This function returns the size of the stream. For example, for a file it is the
 size of the file.
@@ -85,7 +89,7 @@ In that cases, GetSize returns $0$ so you should always test its return value.
 
 \membersection{wxStreamBase::IsOk}\label{wxstreambaseisok}
 
-\constfunc{wxStreamError}{IsOk}{\void}
+\constfunc{virtual bool}{IsOk}{\void}
 
 Returns true if no error occurred on the stream.
 
@@ -94,6 +98,13 @@ Returns true if no error occurred on the stream.
 \helpref{GetLastError}{wxstreambasegetlasterror}
 
 
+\membersection{wxStreamBase::IsSeekable}\label{wxstreambaseisseekable}
+
+\constfunc{bool}{IsSeekable}{\void}
+
+Returns true if the streams supports seeking to arbitrary offsets.
+
+
 \membersection{wxStreamBase::OnSysRead}\label{wxstreambaseonsysread}
 
 \func{size\_t}{OnSysRead}{\param{void*}{ buffer}, \param{size\_t}{ bufsize}}
@@ -120,8 +131,7 @@ real position.
 
 \membersection{wxStreamBase::OnSysWrite}\label{wxstreambaseonsyswrite}
 
-\func{size\_t}{OnSysWrite}{\param{void *}{buffer}, \param{size\_t}{ bufsize}}
+\func{size\_t}{OnSysWrite}{\param{const void *}{buffer}, \param{size\_t}{ bufsize}}
 
 See \helpref{OnSysRead}{wxstreambaseonsysread}.
 
-
</pre></body></html>