X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5873607e5c6d255f5692cc37637551eaeb2e4472..62b4ae0811c3168cd689e202ba8aa8e052916b9b:/docs/latex/wx/pen.tex

diff --git a/docs/latex/wx/pen.tex b/docs/latex/wx/pen.tex
index 5a79e8f523..86516c0081 100644
--- a/docs/latex/wx/pen.tex
+++ b/docs/latex/wx/pen.tex
@@ -66,7 +66,7 @@ data using the reference counting, are not affected.
 \func{}{wxPen}{\void}
 
 Default constructor. The pen will be uninitialised, and \helpref{wxPen::Ok}{wxpenok} will
-return FALSE.
+return false.
 
 \func{}{wxPen}{\param{const wxColour\&}{ colour}, \param{int}{ width}, \param{int}{ style}}
 
@@ -232,7 +232,7 @@ Returns the pen width.
 
 \constfunc{bool}{Ok}{\void}
 
-Returns TRUE if the pen is initialised.
+Returns true if the pen is initialised.
 
 \membersection{wxPen::SetCap}\label{wxpensetcap}
 
