X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5873607e5c6d255f5692cc37637551eaeb2e4472..2c6f14e1a7b5062fcf77eda40824d820d9ac288e:/docs/latex/wx/pen.tex

diff --git a/docs/latex/wx/pen.tex b/docs/latex/wx/pen.tex
index 5a79e8f523..04dfafb1bf 100644
--- a/docs/latex/wx/pen.tex
+++ b/docs/latex/wx/pen.tex
@@ -66,9 +66,9 @@ data using the reference counting, are not affected.
 \func{}{wxPen}{\void}
 
 Default constructor. The pen will be uninitialised, and \helpref{wxPen::Ok}{wxpenok} will
-return FALSE.
+return false.
 
-\func{}{wxPen}{\param{const wxColour\&}{ colour}, \param{int}{ width}, \param{int}{ style}}
+\func{}{wxPen}{\param{const wxColour\&}{ colour}, \param{int}{ width = $1$}, \param{int}{ style = {\tt wxSOLID}}}
 
 Constructs a pen from a colour object, pen width and style.
 
@@ -232,7 +232,7 @@ Returns the pen width.
 
 \constfunc{bool}{Ok}{\void}
 
-Returns TRUE if the pen is initialised.
+Returns true if the pen is initialised.
 
 \membersection{wxPen::SetCap}\label{wxpensetcap}
 
