X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/57d7f9888e18d350fb023fdccd39e0ab7a3bb8dd..3cc305b2b4a0674c56c84d7088cfd70676b850f0:/docs/latex/wx/stdbtnsz.tex?ds=sidebyside

diff --git a/docs/latex/wx/stdbtnsz.tex b/docs/latex/wx/stdbtnsz.tex
index be6fcd54e8..11e9fc09f3 100644
--- a/docs/latex/wx/stdbtnsz.tex
+++ b/docs/latex/wx/stdbtnsz.tex
@@ -25,6 +25,10 @@ the wxID\_NO button will be renamed to "Don't Save" in accordance with the Mac O
 
 <wx/sizer.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxSizer}{wxsizer}, \helpref{Sizer overview}{sizeroverview}, \helpref{wxDialog::CreateButtonSizer}{wxdialogcreatebuttonsizer}
