X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/56b88f1276ea4049a21f6174842b56ca9f280a3f..4d4f4290eaf2b60554ca3a0c53ffa8805012e155:/docs/latex/wx/checklst.tex

diff --git a/docs/latex/wx/checklst.tex b/docs/latex/wx/checklst.tex
index b1de4bfff7..5c87a371fb 100644
--- a/docs/latex/wx/checklst.tex
+++ b/docs/latex/wx/checklst.tex
@@ -7,6 +7,9 @@ class under Windows wxWindows must be compiled with USE\_OWNER\_DRAWN set to 1.
 
 Only the new functions for this class are documented; see also \helpref{wxListBox}{wxlistbox}.
 
+Please note that wxCheckListBox uses client data in its implementation,
+and therefore this is not available to the application.
+
 \wxheading{Derived from}
 
 \helpref{wxListBox}{wxlistbox}\\
