X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/567f21d2cd0a33e16ee08796e2b0e776b51db1bf..d1853d4765d02a9842c7a8721ef2329d09429262:/docs/latex/wx/dllload.tex

diff --git a/docs/latex/wx/dllload.tex b/docs/latex/wx/dllload.tex
index 9884c577ce..cacac58090 100644
--- a/docs/latex/wx/dllload.tex
+++ b/docs/latex/wx/dllload.tex
@@ -145,48 +145,3 @@ FALSE; may also be {\tt NULL}.}
 This function unloads the shared library. The handle {\it dllhandle} must have
 been returned by \helpref{LoadLibrary}{wxdllloaderloadlibrary} previously.
 
-\section{\class{wxDynamicLibrary}}\label{wxdynamiclibrary}
-
-wxDynamicLibrary is a class representing dynamically loadable library
-(Windows DLL, shared library under Unix etc.). It is implemented as a wrapper
-to \helpref{wxDllLoader}{wxdllloader}.
-
-\wxheading{See also}
-
-\helpref{wxDllLoader}{wxdllloader}
-
-\membersection{wxDynamicLibrary::wxDynamicLibrary}\label{wxdynamiclibrarywxdynamiclibrary}
-
-\func{}{wxDynamicLibrary}{\void}
-
-\func{}{wxDynamicLibrary}{\param{const wxString\& }{name}}
-
-Constructor. Second form calls \helpref{Load}{wxdynamiclibraryload}.
-
-\membersection{wxDynamicLibrary::IsLoaded}\label{wxdynamiclibraryisloaded}
-
-\constfunc{bool}{IsLoaded}{\void}
-
-Returns TRUE if the library was successfully loaded, FALSE otherwise.
-
-\membersection{wxDynamicLibrary::Load}\label{wxdynamiclibraryload}
-
-\func{bool}{Load}{\param{const wxString\& }{name}}
-
-Loads DLL into memory.
-
-Returns TRUE if the library was successfully loaded, FALSE otherwise.
-
-\membersection{wxDynamicLibrary::Unload}\label{wxdynamiclibraryunload}
-
-\func{void}{Unload}{\void}
-
-Unloads the library from memory.
-
-\membersection{wxDynamicLibrary::GetSymbol}\label{wxdynamiclibrarygetsymbol}
-
-\constfunc{void*}{GetSymbol}{\param{const wxString\& }{name}}
-
-Returns pointer to symbol {\it name} in the library or NULL if the library
-contains no such symbol.
-
