X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/567f21d2cd0a33e16ee08796e2b0e776b51db1bf..a49686b4c29e431ed24b14fae4d97140d447a149:/docs/latex/wx/idleevt.tex

diff --git a/docs/latex/wx/idleevt.tex b/docs/latex/wx/idleevt.tex
index edba768343..5ba984e481 100644
--- a/docs/latex/wx/idleevt.tex
+++ b/docs/latex/wx/idleevt.tex
@@ -39,7 +39,7 @@ Constructor.
 
 \membersection{wxIdleEvent::RequestMore}\label{wxidleeventrequestmore}
 
-\func{void}{RequestMore}{\param{bool}{ needMore = TRUE}}
+\func{void}{RequestMore}{\param{bool}{ needMore = true}}
 
 Tells wxWindows that more processing is required. This function can be called by an OnIdle
 handler for a window or window event handler to indicate that wxApp::OnIdle should
@@ -55,7 +55,7 @@ new event is posted to the application by the windowing system.
 
 \constfunc{bool}{MoreRequested}{\void}
 
-Returns TRUE if the OnIdle function processing this event requested more processing time.
+Returns true if the OnIdle function processing this event requested more processing time.
 
 \wxheading{See also}
 
