X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5656c6ef369f69d25e201cdfee727d2a8c2721b5..df22f86063643de23dd02c2a77217d07b1918be1:/docs/latex/wx/htwindow.tex?ds=sidebyside

diff --git a/docs/latex/wx/htwindow.tex b/docs/latex/wx/htwindow.tex
index 2093c7c37b..0d4ce6ecb4 100644
--- a/docs/latex/wx/htwindow.tex
+++ b/docs/latex/wx/htwindow.tex
@@ -13,17 +13,17 @@ The purpose of this class is to display HTML pages (either local
 file or downloaded via HTTP protocol) in a window. The width
 of the window is constant - given in the constructor - and virtual height
 is changed dynamically depending on page size.
-Once the window is created you can set its content by calling
+Once the window is created you can set its content by calling 
 \helpref{SetPage(text)}{wxhtmlwindowsetpage} or 
 \helpref{LoadPage(filename)}{wxhtmlwindowloadpage}. 
 
 \wxheading{Derived from}
 
-wxScrolledWindow
+\helpref{wxScrolledWindow}{wxscrolledwindow}
 
 \wxheading{Include files}
 
-<wxhtml/wxhtmlwin.h>
+<wx/html/htmlwin.h>
 
 \membersection{wxHtmlWindow::wxHtmlWindow}\label{wxhtmlwindowwxhtmlwindow}
 
@@ -53,6 +53,20 @@ filters. These filters are present by default:
 \item Plain Text filter (this filter is used if no other filter matches)
 \end{itemize}
 
+\membersection{wxHtmlWindow::AppendToPage}\label{wxhtmlwindowappendtopage}
+
+\func{bool}{AppendToPage}{\param{const wxString\& }{source}}
+
+Appends HTML fragment to currently displayed text and refreshes the window. 
+
+\wxheading{Parameters}
+
+\docparam{source}{HTML code fragment}
+
+\wxheading{Return value}
+
+FALSE if an error occurred, TRUE otherwise.
+
 \membersection{wxHtmlWindow::GetInternalRepresentation}\label{wxhtmlwindowgetinternalrepresentation}
 
 \constfunc{wxHtmlContainerCell*}{GetInternalRepresentation}{\void}
@@ -98,6 +112,21 @@ Returns the related frame.
 Moves back to the previous page. (each page displayed using 
 \helpref{LoadPage}{wxhtmlwindowloadpage} is stored in history list.)
 
+\membersection{wxHtmlWindow::HistoryCanBack}\label{wxhtmlwindowhistorycanback}
+
+\func{bool}{HistoryCanBack}{\void}
+
+Returns true if it is possible to go back in the history (i.e. HistoryBack()
+won't fail).
+
+\membersection{wxHtmlWindow::HistoryCanForward}\label{wxhtmlwindowhistorycanforward}
+
+\func{bool}{HistoryCanForward}{\void}
+
+Returns true if it is possible to go forward in the history (i.e. HistoryBack()
+won't fail).
+
+
 \membersection{wxHtmlWindow::HistoryClear}\label{wxhtmlwindowhistoryclear}
 
 \func{void}{HistoryClear}{\void}
@@ -112,7 +141,7 @@ Moves to next page in history.
 
 \membersection{wxHtmlWindow::LoadPage}\label{wxhtmlwindowloadpage}
 
-\func{bool}{LoadPage}{\param{const wxString\& }{location}}
+\func{virtual bool}{LoadPage}{\param{const wxString\& }{location}}
 
 Unlike SetPage this function first loads HTML page from {\it location} 
 and then displays it. See example:
@@ -127,11 +156,42 @@ htmlwin -> SetPage("help/myproject/index.htm");
 
 \wxheading{Return value}
 
-FALSE if an error occured, TRUE otherwise
+FALSE if an error occurred, TRUE otherwise
+
+\membersection{wxHtmlWindow::OnCellClicked}\label{wxhtmlwindowoncellclicked}
+
+\func{virtual void}{OnCellClicked}{\param{wxHtmlCell }{*cell}, \param{wxCoord }{x}, \param{wxCoord }{y}, \param{const wxMouseEvent\& }{event}}
+
+This method is called when a mouse button is clicked inside wxHtmlWindow.
+The default behaviour is to call 
+\helpref{OnLinkClicked}{wxhtmlwindowonlinkclicked} if the cell contains a
+hypertext link.
+
+\wxheading{Parameters}
+
+\docparam{cell}{The cell inside which the mouse was clicked, always a simple
+(i.e. non container) cell}
+
+\docparam{x, y}{The logical coordinates of the click point}
+
+\docparam{event}{The mouse event containing other information about the click}
+
+\membersection{wxHtmlWindow::OnCellMouseHover}\label{wxhtmlwindowoncellmousehover}
+
+\func{virtual void}{OnCellMouseHover}{\param{wxHtmlCell }{*cell}, \param{wxCoord }{x}, \param{wxCoord }{y}}
+
+This method is called when a mouse moves over an HTML cell.
+
+\wxheading{Parameters}
+
+\docparam{cell}{The cell inside which the mouse is currently, always a simple
+(i.e. non container) cell}
+
+\docparam{x, y}{The logical coordinates of the click point}
 
 \membersection{wxHtmlWindow::OnLinkClicked}\label{wxhtmlwindowonlinkclicked}
 
-\func{virtual void}{OnLinkClicked}{\param{const wxHtmlLinkInfo& }{link}}
+\func{virtual void}{OnLinkClicked}{\param{const wxHtmlLinkInfo\& }{link}}
 
 Called when user clicks on hypertext link. Default behaviour is to call 
 \helpref{LoadPage}{wxhtmlwindowloadpage} and do nothing else.
@@ -230,7 +290,7 @@ If you want to load a document from some location use
 
 \wxheading{Return value}
 
-FALSE if an error occured, TRUE otherwise.
+FALSE if an error occurred, TRUE otherwise.
 
 \membersection{wxHtmlWindow::SetRelatedFrame}\label{wxhtmlwindowsetrelatedframe}
 
