X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5656c6ef369f69d25e201cdfee727d2a8c2721b5..5824f314a3ac14fb4f4c8c2db7823076fedbbee8:/docs/latex/wx/htwindow.tex

diff --git a/docs/latex/wx/htwindow.tex b/docs/latex/wx/htwindow.tex
index 2093c7c37b..38d926a76c 100644
--- a/docs/latex/wx/htwindow.tex
+++ b/docs/latex/wx/htwindow.tex
@@ -19,11 +19,11 @@ Once the window is created you can set its content by calling
 
 \wxheading{Derived from}
 
-wxScrolledWindow
+\helpref{wxScrolledWindow}{wxscrolledwindow}
 
 \wxheading{Include files}
 
-<wxhtml/wxhtmlwin.h>
+<wx/html/htmlwin.h>
 
 \membersection{wxHtmlWindow::wxHtmlWindow}\label{wxhtmlwindowwxhtmlwindow}
 
@@ -131,7 +131,7 @@ FALSE if an error occured, TRUE otherwise
 
 \membersection{wxHtmlWindow::OnLinkClicked}\label{wxhtmlwindowonlinkclicked}
 
-\func{virtual void}{OnLinkClicked}{\param{const wxHtmlLinkInfo& }{link}}
+\func{virtual void}{OnLinkClicked}{\param{const wxHtmlLinkInfo\& }{link}}
 
 Called when user clicks on hypertext link. Default behaviour is to call 
 \helpref{LoadPage}{wxhtmlwindowloadpage} and do nothing else.
