X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/564747ee85db2e4243a5d78e4d08037142648286..ecf527c06b7ab2f1101fdc050783d846f4b34f93:/docs/latex/wx/statusbr.tex?ds=sidebyside

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 924eb542d2..9f134c6ac7 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -35,7 +35,7 @@ from an {\bf OnSize} event handler.
 
 \wxheading{See also}
 
-\helpref{wxFrame}{wxframe}
+\helpref{wxFrame}{wxframe}, \helpref{Status bar sample}{samplestatbar}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
@@ -212,6 +212,14 @@ Sets the number of fields, and optionally the field widths.
 in pixels. A value of -1 indicates that the field is variable width; at least one
 field must be -1.}
 
+\membersection{wxStatusBar::SetMinHeight}\label{wxstatusbarsetminheight}
+
+\func{void}{SetMinHeight}{\param{int}{ height}}
+
+Sets the minimal possible hight for the status bar. The real height may be
+bigger than the height specified here depending on the size of the font used by
+the status bar.
+
 \membersection{wxStatusBar::SetStatusText}\label{wxstatusbarsetstatustext}
 
 \func{virtual void}{SetStatusText}{\param{const wxString\& }{text}, \param{int}{ i = 0}}
