X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/53b6d7a29879a67a54e1f26e77a0697fecacf839..d67c33888f65e236adedd65ffbd978607eadc9d5:/docs/latex/wx/statusbr.tex

diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index cc7a3d3b67..f191f0d251 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -18,6 +18,10 @@ be variable length according to the size of the window.
 
 <wx/statusbr.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
