X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/53663be8a5ea8e1c6f178839209b67e8228e4642..6294ac2e91af3408cfa04910b90ad7ace94f1220:/docs/latex/wx/datistrm.tex

diff --git a/docs/latex/wx/datistrm.tex b/docs/latex/wx/datistrm.tex
index 7f45970c4c..2cc7d1b5d9 100644
--- a/docs/latex/wx/datistrm.tex
+++ b/docs/latex/wx/datistrm.tex
@@ -46,7 +46,7 @@ None
 \func{}{wxDataInputStream}{\param{wxInputStream\&}{ stream}, \param{wxMBConv\&}{ conv = wxMBConvUTF8}}
 
 Constructs a datastream object from an input stream. Only read methods will
-be available. The second form is only available in Unicode build of wxWindows.
+be available. The second form is only available in Unicode build of wxWidgets.
 
 \wxheading{Parameters}
 
@@ -135,9 +135,10 @@ Reads a string from a stream. Actually, this function first reads a long
 integer specifying the length of the string (without the last null character) 
 and then reads the string.
 
-In Unicode build of wxWindows, the fuction first reads multibyte (char*)
+In Unicode build of wxWidgets, the fuction first reads multibyte (char*)
 string from the stream and then converts it to Unicode using the {\it conv}
 object passed to constructor and returns the result as wxString. You are
 responsible for using the same convertor as when writing the stream.
 
 See also \helpref{wxDataOutputStream::WriteString}{wxdataoutputstreamwritestring}.
+
