X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/532372a31c2786eef1c84c0c17c031fa02105d1e..a132a1c810bea2d37b09f01524b57440c968de1c:/docs/latex/wx/tdelwin.tex

diff --git a/docs/latex/wx/tdelwin.tex b/docs/latex/wx/tdelwin.tex
index f9df4e54f0..7d7b02a1b1 100644
--- a/docs/latex/wx/tdelwin.tex
+++ b/docs/latex/wx/tdelwin.tex
@@ -17,7 +17,7 @@ decide whether or not to destroy the window.
 If the application is for some reason forcing the application to close
 (\helpref{wxCloseEvent::CanVeto}{wxcloseeventcanveto} returns FALSE), the window should always be destroyed, otherwise there is the option to
 ignore the request, or maybe wait until the user has answered a question
-before deciding whether it's safe to close. The handler for EVT\_CLOSE should
+before deciding whether it is safe to close. The handler for EVT\_CLOSE should
 signal to the calling code if it does not destroy the window, by calling 
 \helpref{wxCloseEvent::Veto}{wxcloseeventveto}. Calling this provides useful information
 to the calling code.
@@ -70,7 +70,7 @@ the exit command altogether.
 
 \wxheading{What should I do to upgrade my 1.xx OnClose to 2.0?}
 
-In wxWindows 1.xx, the {\bf OnClose} function did not actually delete 'this', but signalled
+In wxWindows 1.xx, the {\bf OnClose} function did not actually delete 'this', but signaled
 to the calling function (either {\bf Close}, or the wxWindows framework) to delete
 or not delete the window.
 
