X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/52ee226853ec422d1517de38a0fa76d866c37153..38f1526768e108c7e2e1da50d16115b46004b89f:/docs/latex/wx/scrolwin.tex?ds=sidebyside

diff --git a/docs/latex/wx/scrolwin.tex b/docs/latex/wx/scrolwin.tex
index f7f83b0677..58a60fc533 100644
--- a/docs/latex/wx/scrolwin.tex
+++ b/docs/latex/wx/scrolwin.tex
@@ -97,7 +97,8 @@ to build your own scroll behaviour.
 
 \wxheading{See also}
 
-\helpref{wxScrollBar}{wxscrollbar}, \helpref{wxClientDC}{wxclientdc}, \helpref{wxPaintDC}{wxpaintdc}
+\helpref{wxScrollBar}{wxscrollbar}, \helpref{wxClientDC}{wxclientdc},\\
+\helpref{wxPaintDC}{wxpaintdc}, \helpref{wxVScrolledWindow}{wxvscrolledwindow}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
@@ -211,9 +212,9 @@ is disabled.
 
 \wxheading{Parameters}
 
-\docparam{xScrolling}{If TRUE, enables physical scrolling in the x direction.}
+\docparam{xScrolling}{If true, enables physical scrolling in the x direction.}
 
-\docparam{yScrolling}{If TRUE, enables physical scrolling in the y direction.}
+\docparam{yScrolling}{If true, enables physical scrolling in the y direction.}
 
 \wxheading{Remarks}
 
@@ -310,7 +311,7 @@ parameters and returns a tuple of values for x and y.}
 
 \constfunc{bool}{IsRetained}{\void}
 
-Motif only: TRUE if the window has a backing bitmap.
+Motif only: true if the window has a backing bitmap.
 
 \membersection{wxScrolledWindow::PrepareDC}\label{wxscrolledwindowpreparedc}
 
@@ -384,7 +385,7 @@ that direction).
 \func{void}{SetScrollbars}{\param{int}{ pixelsPerUnitX}, \param{int}{ pixelsPerUnitY},\rtfsp
 \param{int}{ noUnitsX}, \param{int}{ noUnitsY},\rtfsp
 \param{int }{xPos = 0}, \param{int}{ yPos = 0},\rtfsp
-\param{bool }{noRefresh = FALSE}}
+\param{bool }{noRefresh = false}}
 
 Sets up vertical and/or horizontal scrollbars.
 
@@ -402,7 +403,7 @@ Sets up vertical and/or horizontal scrollbars.
 
 \docparam{yPos}{Position to initialize the scrollbars in the vertical direction, in scroll units.}
 
-\docparam{noRefresh}{Will not refresh window if TRUE.}
+\docparam{noRefresh}{Will not refresh window if true.}
 
 \wxheading{Remarks}
 
