X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5270a2f939501d8bb83451ddc15408ee929346e2..5db9e0e80de7e0ddec39309ce7788e38610c8f40:/docs/latex/wx/htwindow.tex

diff --git a/docs/latex/wx/htwindow.tex b/docs/latex/wx/htwindow.tex
index 2a821551f8..cbedbca677 100644
--- a/docs/latex/wx/htwindow.tex
+++ b/docs/latex/wx/htwindow.tex
@@ -285,7 +285,7 @@ This function sets font sizes and faces.
 \wxheading{Parameters}
 
 \docparam{normal\_face}{This is face name for normal (i.e. non-fixed) font. 
-It can be either empty string (then the default face is choosen) or
+It can be either empty string (then the default face is chosen) or
 platform-specific face name. Examples are "helvetica" under Unix or
 "Times New Roman" under Windows.}
 
@@ -309,7 +309,7 @@ Under Windows:
     SetFonts("", "", {7, 8, 10, 12, 16, 22, 30});
 \end{verbatim}
 
-Athough it seems different the fact is that the fonts are of approximately
+Although it seems different the fact is that the fonts are of approximately
 same size under both platforms (due to wxMSW / wxGTK inconsistency)
 
 \membersection{wxHtmlWindow::SetPage}\label{wxhtmlwindowsetpage}
