X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/520d19362280287d359ed85e235aaa570301556b..8dba8632c5bcd64724e2e9e2d40e295555a0cb86:/docs/latex/wx/thread.tex

diff --git a/docs/latex/wx/thread.tex b/docs/latex/wx/thread.tex
index 34028509b8..1fe11c9e73 100644
--- a/docs/latex/wx/thread.tex
+++ b/docs/latex/wx/thread.tex
@@ -266,7 +266,9 @@ This function can only be called from another thread context.
 
 \func{void}{SetPriority}{\param{int}{ priority}}
 
-Sets the priority of the thread, between zero and 100. This must be set before the thread is created.
+Sets the priority of the thread, between $0$ and $100$. It can only be set
+after calling \helpref{Create()}{wxthreadcreate} but before calling 
+\helpref{Run()}{wxthreadrun}.
 
 The following priorities are already defined:
 
