X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/520d19362280287d359ed85e235aaa570301556b..6e76b35d73fb5a043fd39af266bd452a6e20a861:/docs/latex/wx/critsect.tex?ds=inline

diff --git a/docs/latex/wx/critsect.tex b/docs/latex/wx/critsect.tex
index d2c67ee3df..83cf6fb8c7 100644
--- a/docs/latex/wx/critsect.tex
+++ b/docs/latex/wx/critsect.tex
@@ -1,6 +1,6 @@
 \section{\class{wxCriticalSection}}\label{wxcriticalsection}
 
-A critical section object is used for the same exactly purpose as 
+A critical section object is used for exactly the same purpose as 
 \helpref{mutexes}{wxmutex}. The only difference is that under Windows platform
 critical sections are only visible inside one process, while mutexes may be
 shared between processes, so using critical sections is slightly more
@@ -25,7 +25,7 @@ None.
 \wxheading{See also}
 
 \helpref{wxThread}{wxthread}, \helpref{wxCondition}{wxcondition}, 
-\helpref{wxMutexLocker}{wxmutexlocker}, \helpref{wxCriticalSection}{wxcriticalsection}
+\helpref{wxCriticalSectionLocker}{wxcriticalsectionlocker}
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
@@ -39,7 +39,7 @@ Default constructor initializes critical section object.
 
 \func{}{\destruct{wxCriticalSection}}{\void}
 
-Destructor frees the ressources.
+Destructor frees the resources.
 
 \membersection{wxCriticalSection::Enter}\label{wxcriticalsectionenter}
 
