X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/515da557f1dcd6ec579bf0ca548b02b27e861c79..96db102a93ed103a1c757c4445dd71789c2d0054:/docs/latex/wx/boxsizer.tex?ds=sidebyside

diff --git a/docs/latex/wx/boxsizer.tex b/docs/latex/wx/boxsizer.tex
index 2f765063cd..1e10ddc109 100644
--- a/docs/latex/wx/boxsizer.tex
+++ b/docs/latex/wx/boxsizer.tex
@@ -16,8 +16,8 @@ the buttons shall be centred as the width of the dialog changes.
 It is the unique feature of a box sizer, that it can grow in both directions (height and
 width) but can distribute its growth in the main direction (horizontal for a row) {\it unevenly}
 among its children. In our example case, the vertical sizer is supposed to propagate all its
-height changes to only the text area, not to the button area. This is determined by the
-{\it option} parameter when adding a window (or another sizer) to a sizer. It is interpreted
+height changes to only the text area, not to the button area. This is determined by the {\it option} parameter
+when adding a window (or another sizer) to a sizer. It is interpreted
 as a weight factor, i.e. it can be zero, indicating that the window may not be resized
 at all, or above zero. If several windows have a value above zero, the value is interpreted
 relative to the sum of all weight factors of the sizer, so when adding two windows with
@@ -77,17 +77,13 @@ MyDialog::MyDialog(wxFrame *parent, wxWindowID id, const wxString &title ) :
 
   topsizer->Fit( this );            // set size to minimum size as calculated by the sizer
   topsizer->SetSizeHints( this );   // set size hints to honour mininum size
-  
 }
 \end{verbatim}
 
-
 \wxheading{Derived from}
 
 \helpref{wxSizer}{wxsizer}
-
-\latexignore{\rtfignore{\wxheading{Members}}}
-
+\helpref{wxObject}{wxobject}
 
 \membersection{wxBoxSizer::wxBoxSizer}\label{wxboxsizerwxboxsizer}
 
@@ -100,13 +96,22 @@ or wxHORIZONTAL for creating either a column sizer or a row sizer.
 
 \func{void}{RecalcSizes}{\void}
 
+Implements the calculation of a box sizer's dimensions and then sets
+the size of its its children (calling \helpref{wxWindow::SetSize}{wxwindowsetsize}
+if the child is a window). It is used internally only and must not be called 
+by the users. Documented for information.
 
 \membersection{wxBoxSizer::CalcMin}\label{wxboxsizercalcmin}
 
 \func{wxSize}{CalcMin}{\void}
 
+Implements the calculation of a box sizer's minimal. It is used internally
+only and must not be called by the users. Documented for information.
 
 \membersection{wxBoxSizer::GetOrientation}\label{wxboxsizergetorientation}
 
 \func{int}{GetOrientation}{\void}
 
+Returns the orientation of the boxsizer, either of wxVERTICAL
+or wxHORIZONTAL.
+
