X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/5101728b68e7d2ec7c82b9b1898f5ec614a6c6ee..6a27c749b302e17446080bb232ef8010b60f3d00:/docs/latex/wx/slider.tex?ds=inline

diff --git a/docs/latex/wx/slider.tex b/docs/latex/wx/slider.tex
index 1aac3bb4a7..23b2a1c387 100644
--- a/docs/latex/wx/slider.tex
+++ b/docs/latex/wx/slider.tex
@@ -3,8 +3,7 @@
 A slider is a control with a handle which can be pulled
 back and forth to change the value.
 
-In Windows versions below Windows 95, a scrollbar is used to simulate the slider. In Windows 95,
-the track bar control is used.
+On Windows, the track bar control is used.
 
 Slider events are handled in the same way as a scrollbar.
 
@@ -32,8 +31,7 @@ Slider events are handled in the same way as a scrollbar.
 \twocolitem{\windowstyle{wxSL\_RIGHT}}{Displays ticks on the right, if a vertical slider.}
 \twocolitem{\windowstyle{wxSL\_TOP}}{Displays ticks on the top, if a horizontal slider.}
 \twocolitem{\windowstyle{wxSL\_SELRANGE}}{Allows the user to select a range on the slider. Windows 95 only.}
-\twocolitem{\windowstyle{wxSL\_INVERSE}}{Inverses the mininum and maximum endpoints on the slider. wxGTK only.}
-\end{twocollist}
+\twocolitem{\windowstyle{wxSL\_INVERSE}}{Inverses the mininum and maximum endpoints on the slider. Not compatible with wxSL\_SELRANGE.}\end{twocollist}
 
 See also \helpref{window styles overview}{windowstyles}.
 
