X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4eecf1150d4954e389f49c402756f2381915dd10..cc20da41278e57396bda09f540fc649663b8ded8:/docs/latex/wx/htdcrend.tex

diff --git a/docs/latex/wx/htdcrend.tex b/docs/latex/wx/htdcrend.tex
index 21b93dc62a..0d1bcd9af5 100644
--- a/docs/latex/wx/htdcrend.tex
+++ b/docs/latex/wx/htdcrend.tex
@@ -35,15 +35,6 @@ Assign DC instance to the renderer.
 (Many dimensions in HTML are given in pixels -- e.g. image sizes. 300x300 image would be only one
 inch wide on typical printer. With pixel\_scale = 3.0 it would be 3 inches.)
 
-\wxheading{Parameters}
-
-\docparam{maxwidth}{width of the area (on this DC) that is equivalent to the screen's width, 
-in pixels (you should set it to page width minus margins). 
-
-{\bf Note:} In the current implementation
-the screen width is always 800 pixels: it gives best results and ensures (almost) same printed outputs
-across platforms and differently configured desktops.}
-
 \membersection{wxHtmlDCRenderer::SetFonts}\label{wxhtmldcrenderersetfonts}
 
 \func{void}{SetFonts}{\param{wxString }{normal\_face}, \param{wxString }{fixed\_face}, \param{const int }{*sizes = NULL}}
