X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4e675101a7fabdeaed5520257bf3dda457f54178..7e57f04a1731a9c2cb199a5c0d8ab7fab1afdc65:/docs/latex/wx/display.tex

diff --git a/docs/latex/wx/display.tex b/docs/latex/wx/display.tex
index 87723079c6..47047a8b6a 100644
--- a/docs/latex/wx/display.tex
+++ b/docs/latex/wx/display.tex
@@ -106,7 +106,7 @@ Returns the index of the display on which the given point lies.  Returns
 
 \membersection{wxDisplay::GetFromWindow}\label{wxdisplaygetfromwindow}
 
-\func{static int}{GetFromWindow}{\param{wxWindow* }{win}}
+\func{static int}{GetFromWindow}{\param{const wxWindow* }{win}}
 
 Returns the index of the display on which the given window lies.
 
