X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4e43c815181033d3c037dbea51213f9610e3f21a..e894be201b9866e2f5dbf29050bd1aaa58d95cc4:/docs/latex/wx/window.tex

diff --git a/docs/latex/wx/window.tex b/docs/latex/wx/window.tex
index a718081c98..ce35f652a9 100644
--- a/docs/latex/wx/window.tex
+++ b/docs/latex/wx/window.tex
@@ -689,6 +689,10 @@ a wxTextCtrl under wxGTK) but is not implemented on all platforms nor for all
 controls so it is mostly just a hint to wxWidgets and not a mandatory
 directive.
 
+\wxheading{See also}
+
+\helpref{wxWindowUpdateLocker}{wxwindowupdatelocker}
+
 
 \membersection{wxWindow::GetAcceleratorTable}\label{wxwindowgetacceleratortable}
 
@@ -3411,6 +3415,10 @@ Reenables window updating after a previous call to
 \helpref{Freeze}{wxwindowfreeze}. To really thaw the control, it must be called
 exactly the same number of times as \helpref{Freeze}{wxwindowfreeze}.
 
+\wxheading{See also}
+
+\helpref{wxWindowUpdateLocker}{wxwindowupdatelocker}
+
 
 \membersection{wxWindow::TransferDataFromWindow}\label{wxwindowtransferdatafromwindow}
 
