X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4e43c815181033d3c037dbea51213f9610e3f21a..dba7934c9d1b520ff7b48cd0d80cc52f8be6a052:/docs/latex/wx/listview.tex

diff --git a/docs/latex/wx/listview.tex b/docs/latex/wx/listview.tex
index c5a46dcc11..e19a0b512b 100644
--- a/docs/latex/wx/listview.tex
+++ b/docs/latex/wx/listview.tex
@@ -63,7 +63,7 @@ Sets focus to the item with the given {\it index}.
 \constfunc{long}{GetFirstSelected}{\void}
 
 Returns the first selected item in a (presumably) multiple selection control.
-Tigether with \helpref{GetNextSelected}{wxlistviewgetnextselected} it can be
+Together with \helpref{GetNextSelected}{wxlistviewgetnextselected} it can be
 used to iterate over all selected items in the control.
 
 \wxheading{Return value}
