X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4e43c815181033d3c037dbea51213f9610e3f21a..86015e55eb22b19b31f2267fc39eb958192f4ac6:/docs/latex/wx/listview.tex?ds=inline

diff --git a/docs/latex/wx/listview.tex b/docs/latex/wx/listview.tex
index c5a46dcc11..7758ebec2d 100644
--- a/docs/latex/wx/listview.tex
+++ b/docs/latex/wx/listview.tex
@@ -63,7 +63,7 @@ Sets focus to the item with the given {\it index}.
 \constfunc{long}{GetFirstSelected}{\void}
 
 Returns the first selected item in a (presumably) multiple selection control.
-Tigether with \helpref{GetNextSelected}{wxlistviewgetnextselected} it can be
+Together with \helpref{GetNextSelected}{wxlistviewgetnextselected} it can be
 used to iterate over all selected items in the control.
 
 \wxheading{Return value}
@@ -97,7 +97,7 @@ Returns the next selected item or $-1$ if there are no more of them.
 
 \membersection{wxListView::IsSelected}\label{wxlistviewisselected}
 
-\func{bool}{IsSelected}{\param{long }{index}}
+\constfunc{bool}{IsSelected}{\param{long }{index}}
 
 Returns {\tt true} if the item with the given {\it index} is selected, 
 {\tt false} otherwise.
