X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4e43c815181033d3c037dbea51213f9610e3f21a..85136e3bf5dadf921652519e71da5db351fb3194:/docs/latex/wx/mdi.tex

diff --git a/docs/latex/wx/mdi.tex b/docs/latex/wx/mdi.tex
index fc91d4f436..02586b0736 100644
--- a/docs/latex/wx/mdi.tex
+++ b/docs/latex/wx/mdi.tex
@@ -6,6 +6,7 @@ which is itself a child of \helpref{wxMDIParentFrame}{wxmdiparentframe}.
 \wxheading{Derived from}
 
 \helpref{wxFrame}{wxframe}\\
+\helpref{wxTopLevelWindow}{wxtoplevelwindow}\\
 \helpref{wxWindow}{wxwindow}\\
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
@@ -14,6 +15,10 @@ which is itself a child of \helpref{wxMDIParentFrame}{wxmdiparentframe}.
 
 <wx/mdi.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Window styles}
 
 \twocolwidtha{5cm}
@@ -160,6 +165,10 @@ more \helpref{wxMDIChildFrame}{wxmdichildframe} objects.
 
 <wx/mdi.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Remarks}
 
 The client window is the area where MDI child windows exist. It doesn't have to cover the whole
@@ -228,6 +237,7 @@ and is used in many popular Windows applications, such as Microsoft Word(TM).
 \wxheading{Derived from}
 
 \helpref{wxFrame}{wxframe}\\
+\helpref{wxTopLevelWindow}{wxtoplevelwindow}\\
 \helpref{wxWindow}{wxwindow}\\
 \helpref{wxEvtHandler}{wxevthandler}\\
 \helpref{wxObject}{wxobject}
@@ -236,6 +246,10 @@ and is used in many popular Windows applications, such as Microsoft Word(TM).
 
 <wx/mdi.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Remarks}
 
 There may be multiple MDI parent frames in a single application, but this probably only makes sense
