X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4e43c815181033d3c037dbea51213f9610e3f21a..813210ca7e63cb0a8e2a145664c8b638ea65c15e:/docs/latex/wx/window.tex?ds=sidebyside

diff --git a/docs/latex/wx/window.tex b/docs/latex/wx/window.tex
index a718081c98..4c15ed1719 100644
--- a/docs/latex/wx/window.tex
+++ b/docs/latex/wx/window.tex
@@ -689,6 +689,10 @@ a wxTextCtrl under wxGTK) but is not implemented on all platforms nor for all
 controls so it is mostly just a hint to wxWidgets and not a mandatory
 directive.
 
+\wxheading{See also}
+
+\helpref{wxWindowUpdateLocker}{wxwindowupdatelocker}
+
 
 \membersection{wxWindow::GetAcceleratorTable}\label{wxwindowgetacceleratortable}
 
@@ -1107,9 +1111,9 @@ windows.
 
 \wxheading{Parameters}
 
-\docparam{x}{Receives the x position of the window.}
+\docparam{x}{Receives the x position of the window if non-\NULL.}
 
-\docparam{y}{Receives the y position of the window.}
+\docparam{y}{Receives the y position of the window if non-\NULL.}
 
 \pythonnote{In place of a single overloaded method name, wxPython
 implements the following methods:\par
@@ -1129,12 +1133,53 @@ method:\par
 }}
 
 
+\wxheading{See also}
+
+\helpref{GetScreenPosition}{wxwindowgetscreenposition}
+
+
 \membersection{wxWindow::GetRect}\label{wxwindowgetrect}
 
 \constfunc{virtual wxRect}{GetRect}{\void}
 
 Returns the size and position of the window as a \helpref{wxRect}{wxrect} object.
 
+\wxheading{See also}
+
+\helpref{GetScreenRect}{wxwindowgetscreenrect}
+
+
+\membersection{wxWindow::GetScreenPosition}\label{wxwindowgetscreenposition}
+
+\constfunc{virtual void}{GetScreenPosition}{\param{int* }{x}, \param{int* }{y}}
+
+\constfunc{wxPoint}{GetScreenPosition}{\void}
+
+Returns the window position in screen coordinates, whether the window is a
+child window or a top level one.
+
+\wxheading{Parameters}
+
+\docparam{x}{Receives the x position of the window on the screen if non-\NULL.}
+
+\docparam{y}{Receives the y position of the window on the screen if non-\NULL.}
+
+\wxheading{See also}
+
+\helpref{GetPosition}{wxwindowgetposition}
+
+
+\membersection{wxWindow::GetScreenRect}\label{wxwindowgetscreenrect}
+
+\constfunc{virtual wxRect}{GetScreenRect}{\void}
+
+Returns the size and position of the window on the screen as a 
+\helpref{wxRect}{wxrect} object.
+
+\wxheading{See also}
+
+\helpref{GetRect}{wxwindowgetrect}
+
 
 \membersection{wxWindow::GetScrollPos}\label{wxwindowgetscrollpos}
 
@@ -2314,7 +2359,7 @@ not delete) it from it.
 
 \wxheading{Parameters}
 
-\docparam{handler}{The event handler to remove, must be non {\tt NULL} and
+\docparam{handler}{The event handler to remove, must be non-{\tt NULL} and
 must be present in this windows event handlers chain}
 
 \wxheading{Return value}
@@ -3411,6 +3456,10 @@ Reenables window updating after a previous call to
 \helpref{Freeze}{wxwindowfreeze}. To really thaw the control, it must be called
 exactly the same number of times as \helpref{Freeze}{wxwindowfreeze}.
 
+\wxheading{See also}
+
+\helpref{wxWindowUpdateLocker}{wxwindowupdatelocker}
+
 
 \membersection{wxWindow::TransferDataFromWindow}\label{wxwindowtransferdatafromwindow}
 
