X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/4e0e7d3935aadb591b643a1123b7508b09814193..2b147f2e19c90ea74a4f96260ef8954a9bfbe2f1:/docs/latex/wx/debugrptpvw.tex

diff --git a/docs/latex/wx/debugrptpvw.tex b/docs/latex/wx/debugrptpvw.tex
index bb2f272f85..786e8e4c2b 100644
--- a/docs/latex/wx/debugrptpvw.tex
+++ b/docs/latex/wx/debugrptpvw.tex
@@ -30,6 +30,10 @@ No base class
 
 <wx/debugrpt.h>
 
+\wxheading{Library}
+
+\helpref{wxQa}{librarieslist}
+
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
